─────────────────── You are in the MAIN MENU of Psychic Piano. ─────────────

ABOUT THIS OPTION: If you select the INFO option, additional information on
                   PSYCHIC PIANO features and tips will be displayed.
                   Press [Esc] to return to the MAIN MENU...

────────────────────────────────────────────────────────────────────────────────
   FROM MAIN MENU: Select one of the available options from the MAIN MENU.
                   To quit PSYCHIC PIANO, press [Esc] from  the MAIN MENU.
────────────────────────────────────────────────────────────────────────────────
 TO CHOOSE OPTION: Use [Up] or [Down] arrow key to highlight the function
                   you want and press [Enter].
                   --------------------------- OR ---------------------------
                   Type first letter of option ('G' = GAME); press [Enter].
                   --------------------------- OR ---------------------------
                   Use mouse to point at desired function; press Left Mouse
                   Button twice quickly (Double-Click).

─────────────────── Press [Esc] when finished with Help Screen ─────────────
